/*
 Navicat Premium Data Transfer

 Source Server         : localhost_3306
 Source Server Type    : MySQL
 Source Server Version : 50735
 Source Host           : localhost:3306
 Source Schema         : ecs

 Target Server Type    : MySQL
 Target Server Version : 50735
 File Encoding         : 65001

 Date: 18/11/2024 14:22:57
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for ecs_info
-- ----------------------------
DROP TABLE IF EXISTS `ecs_info`;
CREATE TABLE `ecs_info`  (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `not_after` datetime NULL DEFAULT NULL COMMENT '证书有效期结束',
  `url` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '域名',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 88 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_bin ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
